# critical constants: Temperature [T], Pressure [Pa], and Acentric factor [-]. Created by AutoFF
0.0
0.0
0.0
#Number Of Atoms
1
#Number Of Group
1
# ch4-group
flexible
#number of atoms
1
# atomic positions
0      Tra_CH4      1.071500    0.069800   -0.002600
# Chiralcenters Bond BondDipoles Bend UrayBradley InvBend Torsion Imp.Torsion Bond/Bond Stretch/Bend Bend/Bend Stretch/Torsion Bend/Torsion IntraVDW IntraCoulomb
0  0  0  0  0  0  0  0  0  0  0  0  0  0
# Number of config moves
0
