# critical constants: Temperature [T], Pressure [Pa], and Acentric factor [-]
33.19
1315000.0
-0.214
#Number Of Atoms
3
# Number of groups
1
# H2-group
rigid
# number of atoms
3
# atomic positions
0 H_h2    0.0           0.0           0.37
1 H_com   0.0           0.0           0.0
2 H_h2    0.0           0.0          -0.37
# Chiral centers Bond  BondDipoles Bend  UrayBradley InvBend  Torsion Imp. Torsion Bond/Bond Stretch/Bend Bend/Bend Stretch/Torsion Bend/Torsion IntraVDW IntraCoulomb
               0    2            0    0            0       0        0            0         0            0         0               0            0        0            0
# Bond stretch: atom n1-n2, type, parameters
0 1 RIGID_BOND
1 2 RIGID_BOND
# Number of config moves
0
